AEK90-5N,

TLS11 Reflection colorimetry, System WCGa, L*ABJND-L*ABCh, Y_{Nn} = 1.26, L*_{Nn} = 11, Y_{Wa} = 88,6 Colour D:2020090112000 D:2020090112000 klaus.richter@mac.com