AGK81-3N,

TLS38-Reflexionsfarbmetrik, System WCGa, CIELAB-LabC*h, Y_{Nn} = 10.08, L*_{Nn} = 37.99, Y_{Wa} = 88,6 Farbe D:2020090112000 D:2020090112000 klaus.richter@mac.com