DEO40-1A

Munsell System, Y_W=100 D-series, 2-degree, klaus.richter@mac.com in the chromaticity diagram (x, y)

0,0 0,2 0,4 0,6 0,8 1,0 0,0

0,2

0,4

0,6

0,8

x y

CIE 1931

TS Sm

BeMλ=Sλ

V’Vλ=Sλ

Geyλ=Bλ

MmVmYeRePLDM

1 25