DGV21-2N

Ostw-Daten rgb*, XYZxy und LabC*h_{ab} im CIELAB-Farbraum Normfarbwerte von Schwarz und Weiß: Y_{Nn}=0,0, Y_{Wn}=0,0, Y_{Wa}=88,6.

rgb*_d

a* = 500 [(X / X_{D65})^{1/3} - (Y / Y_{D65})^{1/3} ] [1a] b* = 200 [(Y / Y_{D65})^{1/3} - (Z / Z_{D65})^{1/3} ] [2a] C*_{ab} = [ a*^2 + b*^2 ] ^{0,5} [3a] h_{ab} = atan [ b* / a* ] [4a]

-150 -100 -50 50 100

100

50

-50

-100

b*

a*