AEB81-5N

PDF- and PS-test files for relative colour image reproduction according to DIN 33872-1 to -6:2010

These DIN-test charts serve for the colorimetric specification, and the visual assessment of the display and print output.

For free download of the test charts see http://farbe.li.tu-berlin.de/A/33872E.html

For similar DIN-test charts according to DIN 33866-1 to -5:2000 see http://farbe.li.tu-berlin.de/A/DE13/DE13.HTM

For more test charts, standards and applications see http://farbe.li.tu-berlin.de/A/INFOALAE.html