AEB81-6N

Ergonomic and colorimetric colour image reproduction

For the ergonomic and colorimetric colour image reproduction see Richter, Klaus (2016), Output linearization method OLM16 for displays, printers, and offset, 61 pages, 1,4MB. http://farbe.li.tu-berlin.de/OUTLIN16_01.PDF (Content similar to CIE R8-09:2015, free download for CIE-members.)

For a list of publications of Klaus Richter see http://farbe.li.tu-berlin.de/XY91FEN.html

For basic information in 6 languages (EN, GE, FR, IT, SP, NO): Klaus Richter (2015), Colour, colour vision, and elementary colours in colour information technology, 86 pages, 2,2 MB, see http://standards.iso.org/iso/9241/306/ed-2/ES15.PDF