AGL80-5N,

TLS11-Reflexionsfarbmetrik, System sRGB, CIELAB-LabC*h, Y_{Nn} = 1.26, L*_{Nn} = 11, Y_{Za} = 18,0 Farbe D:2020090112000 D:2020090112000 klaus.richter@mac.com