BEU50-1N

lightness L* and tristimulus value Y L*W = 100 ( Y / 100)1/2,0 L*Z = 100 ( Y / 100)1/2,4 L*CIELAB = 116 ( Y / 100)1/3,0 - 16 L*N = 100 ( Y / 100)1/3,0