1-003030-L0 CET01-3N

NW-achromatic and RG- and JB-chromatic thresholds as function of Y

experiments and data: BAM-research report no. 115 (1985), page 72 Colorimetric differences at the threshold

Δ(luminous values) = Y1 - Y2 Δ(RG-chromaticities) · mean luminous value Y Δ(JB-chromaticities) · mean luminous value Y

Y = 0,5 (Y1 + Y2) Δb · Y JB-direction Δa · Y RG-direction ΔY NW-direction

Δa = x1 / y1 - x2 / y2 Δb = z1 / y1 - z2 / y2 ΔY=Y2 -Y1 Y1 Y2 Yu Yw Yu=18, luminous value of gray background ΔY = s + c Y = 0,017 + 0,0058 Y Yw=90, white surround -1 0 1 2 3 x = log Y -2

-1

0

2