OE93/OE93L0NA.PDF /.PS, Page 4/4, FF_LM: all->rgbd; 1MR, DH

CYN5 (36:1): gP=1; gN=1.29 http://130.149.60.45/~farbmetrik/OE93/OE93F13N.PDF /.PS