SS211-6N

8 device colours (d) in device system (RJGCBM)_d, NW and (CMY)_d triangle system cmy*_d cylindric system tch* triangle lightness t* relative chroma c* CIELAB hue angle h_{ab} device hue text u*_d

c*_d = 1 - r*_d m*_d = 1 - g*_d y*_d = 1 - b*_d

more coordinates and relations: http://www.ps.bam.de/33872E

t*