eep21-3n

Equal 9 step grey scaling between L*0aN=3.6 and L*0aW=95.9, Y0ref=0.9, normalisation white W L*0aN=0, L*0aU=0, L*0aW=0, Y0aN=0, Y0aU=0, Y0aW=0, C0aY=Y0aW:Y0aN=0 L*taN=, L*taU=, L*taW=, YtaN=, YtaU=, YtaW=, CtaY=YtaW:YtaN= Regularity index according to ISO/IEC 15775:2022, annex G for 5 and 9 steps g* = 100 [ΔL*min] / [ΔL*max], L*CIELAB = 116 [Y/Yn]1/3 - 16 with Y >= 0,882, Yn=100 g*5= 99900, g*9= 99900 g*5= 99900, g*9= 99900 g*5= 99900, g*9= 99900 L*CIELAB intended output real output linearized output n0. i L*0a L*0r Y0a Y0r L*ta ΔL*ta L*tr Yta (L*tr)1/0 L*la ΔL*la

ΔL*0a= (i=1,2,...,8) normalisation: YtaiW=Y0aW

Y0ai+Y0ref Y0aW+Y0ref