her11-7n fek00-7n,ch

x_r = log[ L/L_u]

L_u

L_u=28cd/m^2 L x_u=

range of office luminance

P_{abu}(L_r,m)=normalized achromatic receptor response

P’_{abuc}(L_r ,m)=4 / [L_r^{m(a)}+ L_r^{-m(c)}]^2 = 4 / [p + q]^2

a=1,00; b=1,00

P’_{abu}(x_r ) Asymptote

P_{abu}(x_r )

NW